-- MySQL dump 10.13  Distrib 8.0.34, for Win64 (x86_64)
--
-- Host: 127.0.0.1    Database: acore_world
-- ------------------------------------------------------
-- Server version	8.0.34

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!50503 SET NAMES utf8mb4 */;
/*!40014 SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;

--
-- Table structure for table `creaturemodeldata_dbc`
--

DROP TABLE IF EXISTS `creaturemodeldata_dbc`;
/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!50503 SET character_set_client = utf8mb4 */;
CREATE TABLE `creaturemodeldata_dbc` (
  `ID` int NOT NULL DEFAULT '0',
  `Flags` int NOT NULL DEFAULT '0',
  `ModelName` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci DEFAULT NULL,
  `SizeClass` int NOT NULL DEFAULT '0',
  `ModelScale` float NOT NULL DEFAULT '0',
  `BloodID` int NOT NULL DEFAULT '0',
  `FootprintTextureID` int NOT NULL DEFAULT '0',
  `FootprintTextureLength` float NOT NULL DEFAULT '0',
  `FootprintTextureWidth` float NOT NULL DEFAULT '0',
  `FootprintParticleScale` float NOT NULL DEFAULT '0',
  `FoleyMaterialID` int NOT NULL DEFAULT '0',
  `FootstepShakeSize` int NOT NULL DEFAULT '0',
  `DeathThudShakeSize` int NOT NULL DEFAULT '0',
  `SoundID` int NOT NULL DEFAULT '0',
  `CollisionWidth` float NOT NULL DEFAULT '0',
  `CollisionHeight` float NOT NULL DEFAULT '0',
  `MountHeight` float NOT NULL DEFAULT '0',
  `GeoBoxMinX` float NOT NULL DEFAULT '0',
  `GeoBoxMinY` float NOT NULL DEFAULT '0',
  `GeoBoxMinZ` float NOT NULL DEFAULT '0',
  `GeoBoxMaxX` float NOT NULL DEFAULT '0',
  `GeoBoxMaxY` float NOT NULL DEFAULT '0',
  `GeoBoxMaxZ` float NOT NULL DEFAULT '0',
  `WorldEffectScale` float NOT NULL DEFAULT '0',
  `AttachedEffectScale` float NOT NULL DEFAULT '0',
  `MissileCollisionRadius` float NOT NULL DEFAULT '0',
  `MissileCollisionPush` float NOT NULL DEFAULT '0',
  `MissileCollisionRaise` float NOT NULL DEFAULT '0',
  PRIMARY KEY (`ID`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;
/*!40101 SET character_set_client = @saved_cs_client */;

--
-- Dumping data for table `creaturemodeldata_dbc`
--

LOCK TABLES `creaturemodeldata_dbc` WRITE;
/*!40000 ALTER TABLE `creaturemodeldata_dbc` DISABLE KEYS */;
/*!40000 ALTER TABLE `creaturemodeldata_dbc` ENABLE KEYS */;
UNLOCK TABLES;

/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40014 SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;

-- Dump completed on 2024-12-17 22:33:43

