-- --------------------------------------------------------
-- Host:                         127.0.0.1
-- Server version:               8.0.29 - MySQL Community Server - GPL
-- Server OS:                    Win64
-- HeidiSQL Version:             12.0.0.6468
-- --------------------------------------------------------

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET NAMES utf8 */;
/*!50503 SET NAMES utf8mb4 */;
/*!40103 SET @OLD_TIME_ZONE=@@TIME_ZONE */;
/*!40103 SET TIME_ZONE='+00:00' */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;

-- Dumping structure for table acore_auth.logs_ip_actions
DROP TABLE IF EXISTS `logs_ip_actions`;
CREATE TABLE IF NOT EXISTS `logs_ip_actions` (
  `id` int unsigned NOT NULL AUTO_INCREMENT COMMENT 'Unique Identifier',
  `account_id` int unsigned NOT NULL COMMENT 'Account ID',
  `character_guid` int unsigned NOT NULL COMMENT 'Character Guid',
  `type` tinyint unsigned NOT NULL,
  `ip` varchar(15) NOT NULL DEFAULT '127.0.0.1',
  `systemnote` text COMMENT 'Notes inserted by system',
  `unixtime` int unsigned NOT NULL COMMENT 'Unixtime',
  `time` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT 'Timestamp',
  `comment` text COMMENT 'Allows users to add a comment',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci COMMENT='Used to log ips of individual actions';

-- Dumping data for table acore_auth.logs_ip_actions: ~0 rows (approximately)
DELETE FROM `logs_ip_actions`;

/*!40103 SET TIME_ZONE=IFNULL(@OLD_TIME_ZONE, 'system') */;
/*!40101 SET SQL_MODE=IFNULL(@OLD_SQL_MODE, '') */;
/*!40014 SET FOREIGN_KEY_CHECKS=IFNULL(@OLD_FOREIGN_KEY_CHECKS, 1) */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40111 SET SQL_NOTES=IFNULL(@OLD_SQL_NOTES, 1) */;
