CREATE TABLE `world_db_version` (
  `2016_07_09_00` BIT(1) DEFAULT NULL
) ENGINE=MYISAM DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='Last applied sql update to DB';
